Title: Demonstrate the steps for assembly and inspection of instruments.
Course: Surgical Technologist I (14056-I) > Section: Maintaining Instruments

Demonstration should include

- inspecting for cleanliness
- confirming that the instrument functions when reassembled
- testing for sharpness
- placing the required instruments in the appropriate set
- placing the pack monitoring indicators in the appropriate set
- wrapping or sealing the container as appropriate
- identifying the set (naming the set).

Process/Skill Questions:

- What is the purpose of the chemical indicators?
- How are instruments tested for functionality and sharpness?
- How should a set be assembled to prevent damage to the instruments?
- Which chemical indicators are used for each specific sterilization method?