Title: Demonstrate the procedure for opening sterile items and delivering them to the sterile field.
Course: Surgical Technologist I (14056-I) > Section: Applying Aseptic Technique and Surgical Asepsis

Demonstration should follow the standard practice for

- verifying the parameters of sterility and package integrity before the presentation of items to the sterile field
- opening sterile items and delivering them to the sterile field.

Process/Skill Questions:

- When verifying parameters of sterility, why is it essential to check all materials/products for an expiration date? For tears and rips?
- When verifying parameters of sterility, why is it essential to check all materials/products for moisture or stains?