Title: Describe the process for low-temperature sterilization of instruments and supplies.
Course: Surgical Technologist I (14056-I) > Section: Performing Sterilization Procedures

Description should include the physical process of low-temperature sterilization and the concepts that

- low-temperature sterilization is appropriate for heat- and moisture-sensitive materials
- low-temperature sterilization poses risk for employees
- low-temperature sterilization is more time consuming and expensive than other sterilization methods
- ethylene oxide gas used in low-temperature sterilization can penetrate wrapping material and does not corrode metal
- verifying the inclusion and color change of the chemical indicator.

Process/Skill Questions:

- What makes low-temperature sterilization a time-consuming process?
- What makes ethylene oxide gas more lethal than other processes?
- Under what circumstances would ethylene oxide be used?
- What safety precautions are needed when sterilizing with gas?
- What other gases are used in low-temperature sterilization?