Title: Demonstrate donning and doffing surgical gloves.
Course: Surgical Technologist I (14056-I) > Section: Applying Aseptic Technique and Surgical Asepsis

Demonstration should include standard practice for donning and doffing surgical gloves, such as gloving by means of the open and closed methods and changing contaminated glove(s).

Process/Skill Questions:

- How are the open method and closed method of gloving different? When is one selected over the over?
- What is the procedure for changing contaminated gloves? How would an operating room team member know when his/her gloves were contaminated?