Title: Demonstrate correct body mechanics.
Course: Surgical Technologist I (14056-I) > Section: Applying Safety Procedures

Demonstration should include correct body mechanics for lifting, bending, pushing, pulling, and standing. It should also reflect the following precautions against injury:

- Size up the load and assess leverage requirements.
- Call for assistance, if needed.
- Use large muscles.
- Bend the legs.
- Avoid twisting when lifting.
- Prevent falls.
- Use transfer rollers, boards, or lifts.

Process/Skill Questions:

- What occupational practices may place a surgical technologist at risk for physical injury?
- What constitutes proper body mechanics in the surgical setting?
- How can the surgical technologist’s use of proper body mechanics be beneficial to the patient?