Title: Demonstrate basic hand hygiene.
Course: Surgical Technologist I (14056-I) > Section: Applying Aseptic Technique and Surgical Asepsis

Demonstration should follow the standard procedure for hand washing:

- Use floor pedals (or use paper towel to turn faucet).
- Use liquid soap.
- Use friction for 30-60 seconds.
- Keep fingertips pointed downward.
- Remove moisture by holding arms up and drying from fingertips downward.

Process/Skill Questions:

- Why should liquid rather than solid soap be used when washing hands for perioperative procedures?
- Why should fingertips be pointed downward throughout hand hygiene?
- Why should moisture be removed by holding arms up and drying from fingertips downward?
- What could be the consequences for the patient if a surgical team member did not properly follow the standard procedure for hand washing?