Title: Pass a safety exam for lab/site safety and the use of tools and equipment specific to the construction industry with 100 percent accuracy.
Course: Carpentry II (17003-II) > Section: Applying Basic Construction Safety Standards (Core Safety)

Assessment must measure participation in safety training programs, including attending safety meetings and periodically demonstrating knowledge and skills gained from program topics (e.g., interpretation of SDS).

Process/Skill Questions:

- How often should one participate in safety training programs? Why?
- Why are retraining programs relevant to a company's insurance policy?
- What is workers' compensation?

NCCER Core: Introduction to Basic Construction Skills

Module 00101 Basic Safety (Construction Site Safety Orientation) explains the importance of safety in construction and industrial crafts. Trainees will learn how to identify and follow safe work practices and procedures and how to properly inspect and use safety equipment. Trainees will be able to describe the safety practices associated with elevated work; energy release; and various hazards encountered on job sites.