Title: Design an energy system for a renewable resource.
Course: Engineered Energy Systems (20903-II) > Section: Exploring Applications of Engineered Systems

Design may include

- electrical generation system
- gas system.

Design should include

- source of the energy selected
- system components and subsystems
- system inputs, processes, and outputs.

Process/Skill Questions:

- How do inputs and outputs affect a system?
- What are key components and subsystems within an energy system?