Title: Explain how systems affect utility/producer and consumer relationships.
Course: Engineered Energy Systems (20903-II) > Section: Describing Utility/Producer and Consumer Relationships

Explanation may include

- monitoring systems (e.g., online dashboards)
- net metering
- analyzing data
- incentives
- reliability systems
- the grid
- energy storage systems.

Process/Skill Questions:

- What is net metering?
- What is the grid? What are its vulnerabilities?
- What is the difference between analytics and analysis?
- What are statistical process control (SPC) charts?