Title: Demonstrate special safety procedures required for outside equipment.
Course: Telecommunications II (1006-II) > Section: Practicing Safety

Demonstration should include

- using protective barriers in public work areas
- using tools and personal protective equipment (PPE)
- using rubber insulation
- using climbing-lineman body belts, lanyards, and safety straps
- using ladders
- using and grounding portable power equipment
- following safe handling procedures when working on sensitive devices, including protecting an electrostatic discharge.

Process/Skill Questions:

- What are the implications of not understanding the proper use of outside safety equipment?
- Why is cooperation vital in performing safe outside telecommunications work?
- What are common causes of falls?
- When does electrostatic discharge occur?