Title: Prepare the final project report.
Course: Biomedical Engineering (21049) > Section: Using the Engineering Design Process to Solve a Biomedical Problem

Preparation should include

•    abstract
•    introduction
•    research questions and/or hypothesis
•    methods and materials
•    obstacles encountered and solutions found in the process
•    results
•    conclusions
•    appendices (e.g., raw data, sketches, notes, surveys)
•    citations of references used.

Process/Skill Questions:

•    What is an abstract? What is its purpose?
•    What elements belong in an abstract?
•    Why should one include appendices in a report?
•    What is the importance of choosing one’s references carefully and citing them properly?
•    Why is it important to include enough detail in a report to ensure replication?