Title: Use models and simulations in human biomechanics.
Course: Biomedical Engineering (21049) > Section: Exploring Human Biomechanics and Rehabilitation Engineering

Use of models and simulations should include

•    joint level analysis
•    muscle level analysis.

Process/Skill Questions:

•    What criteria should be considered in the level of detail of a model?
•    When would one use generic models vs. customized models?