Title: Iterate on the solution.
Course: Engineering Analysis and Applications II (21016-36) > Section: Applying the Engineering Design Process

Iteration should include

- formulating an alternative solution
- testing the alternative solution
- documenting the final project report
- identify areas needing improvement.

Process/Skill Questions:

- Why should one revisit the solutions proposed in the brainstorming step when formulating an alternative solution to the problem?
- How might the data acquired in the test affect the formulation of an alternative solution?
- What factors might help to justify the alternative solution as optimal?
- What should be recorded in an engineering log or journal?