Title: Apply safety guidelines in appropriate circumstances.
Course: Power Generation Design and Function (20904-II) > Section: Performing Test, Calibrations, and Measurements

Application should include

- Occupational Safety and Health Administration (OSHA) guidelines for construction (29 CFR 1926) and general industry (29 CFR 1910)
  - personal protective equipment (PPE)
  - lockout/tagout procedures
  - confined space
  - hearing protection
  - respiratory protection
  - work permits
  - hazardous waste and materials
- manufacturer guidelines for maintenance and use of tools and equipment
- maintaining lab safety
- conduct testing, calibration, and measurement requirements
- National Electrical Code (NEC) National Fire Protection Association (NFPA 70)
- American Society of Mechanical Engineers (ASME) codes
- National Board of Boiler and Pressure Vessel Inspectors (NBBI) codes
- US Chemical Safety and Hazard Investigation Board (CSB) videos
- US Department of Transportation natural gas pipeline Fatigue Management Mitigation Program
- Federal Pipeline Safety Regulations.

Process/Skill Questions:

- What are some OSHA guidelines for safety?
- What safety guidance does ASME provide?
- What are the guidelines for mitigating employee fatigue in the DOT Fatigue Management Program?