Title: Maintain currency in occupational standards and regulating agency requirements.
Course: Vision Care Technician I (14057-I) > Section: Exploring Clinical Practice

Maintenance should include

- maintaining staff OSHA training and testing
- following OSHA regulations and protocol for the workplace
- reviewing updates as they are available
- maintaining appropriate SDS documentation
- adhering to DPOR regulations (Grounds for Disciplinary Action – 18VAC80-30-160).

Process/Skill Questions:

- For what does OSHA stand?
- What is an SDS?
- What is Career Safe Training?