Title: Demonstrate the skills necessary for daily office operation.
Course: Vision Care Technician I (14057-I) > Section: Exploring Clinical Practice

Demonstration should include

- maintaining inventory where appropriate
- maintaining workstation
- disinfecting/sterilizing equipment
- calibrating machines
- replacing equipment bulbs
- retrieving specialized equipment for specific situations.

Process/Skill Questions:

- What are the opening and closing procedures for an office?
- What is the difference between disinfecting and sterilizing?
- Why must machines/equipment be calibrated regularly?
- How often are they calibrated?