Title: Demonstrate awareness of the safety aspects of high voltage circuits.
Course: Diesel Equipment Technology II (20107-II) > Section: Practicing Lab and Personal Safety

Demonstration should include identifying the manufacturer warning and guidelines regarding shock hazards (e.g., high intensity discharge [HID] lamps, ignition systems, injection systems).

ASE 14: Foundational Tasks: Shop and Personal Safety

Process/Skill Questions:

- What is the typical system voltage of an HID headlight?
- What gas is used in most HID bulbs?
- What do HID bulbs use in place of filaments?