Title: Record the electronic diagnostic codes.
Course: Diesel Equipment Technology II (20107-II) > Section: Diesel Engines: General

Recording includes downloading fault codes with a scan tool or computer and printing the codes for documentation.

ASE 6: VIII. Hydraulics: A. General (P-3)

Process/Skill Questions:

- Where is the fault code identification located?
- How are fault codes cleared in the engine control module (ECM)?
- How do fault codes help the technician?