Title: Demonstrate the use of a thread chaser.
Course: Diesel Equipment Technology II (20107-II) > Section: Fastener Repair and Tool Use

Demonstration should include

- internal thread chaser
- external thread chaser
- thread files
- blind hole repair.

Process/Skill Questions:

- Why is it important to keep your work area clean?
- Why would a thread chaser be used instead of a tap and die kit?