Title: Inspect the crankshaft damper.
Course: Diesel Equipment Technology II (20107-II) > Section: Diesel Engines: Servicing the Engine Block

Inspection should include

- conducting a visual inspection
- using the required puller and installation tools
- determining whether there is a viscous or rubber mounted damper
- following manufacturer guidelines
- determining necessary actions.

ASE 1: I. Diesel Engines: C. Engine Block (P-2)

Process/Skill Questions:

- What tools are needed to remove and install a vibration damper?
- What safety precautions should be taken?
- What would cause a rubber-mounted damper to be separated? Can the damper be reused?