Title: Inspect the service brake chambers, diaphragm, clamp, spring, pushrod, clevis, and mounting brackets.
Course: Diesel Equipment Technology II (20107-II) > Section: Brakes: Servicing the Mechanical/Foundation Brakes

Inspection should include the condition of the brake chambers and associated hardware and a check for missing, damaged, or rusted components.

ASE 1: III. Brakes: C. Air Brakes: Mechanical/Foundation Brake System (P-1)

Process/Skill Questions:

- Why does a service brake chamber leak when the service brakes are applied?
- What is the repair procedure for replacing a service brake chamber?
- What is the difference between a long stroke and standard brake chamber?
- What are possible causes if the brake chambers do not operate according to manufacturer guidelines?