Title: Inspect the power-steering pump drive gear and coupling device.
Course: Diesel Equipment Technology II (20107-II) > Section: Suspension and Steering: Servicing the Steering Column

Inspection should include determining whether the power-steering pump is mounted on the engine.

If it is, it should be inspected for wear while the engine is running. In some instances, the pump may require removal to inspect the coupling device.

ASE 1: IV. Suspension and Steering: C. Steering Pump and Gear Units  (P-1)

Process/Skill Questions:

- What is considered excessive wear?
- What should be done when wear is found?