Title: Demonstrate the proper use of a tap and die set.
Course: Diesel Equipment Technology II (20107-II) > Section: Fastener Repair and Tool Use

Demonstration should include determining

- the thread pitch/size
- the type of measurement units (e.g., U.S. customary, metric)
- whether fine or coarse is needed
- the use of a T handle and die holder.

Process/Skill Questions:

- Why is holding the tap and/or die at the correct angle important?
- Why is it important to know the correct size and thread pitch?
- Why is important to use the correct lubrication?