Title: Service the power-steering reservoir, including filter, seals, and gaskets.
Course: Diesel Equipment Technology II (20107-II) > Section: Suspension and Steering: Servicing the Steering Column

Service should include

- visually inspecting the power-steering reservoir components
- flushing the system
- replacing the fluid according to original equipment manufacturer (OEM) specifications
- replacing the components, as needed.

ASE 1: IV. Suspension and Steering: C. Steering Pump and Gear Units (P-1)

Process/Skill Questions:

- How would one know that a gasket needs replacing?
- Why is it important to check whether the vehicle is equipped with a power-steering filter?