Title: Inspect the air compressor inlet, oil supply and coolant lines, fittings, and mounting brackets.
Course: Diesel Equipment Technology II (20107-II) > Section: Brakes: Servicing Air Brakes

Inspection should include visually examining the air compressor inlet for signs of oil or coolant residue.

ASE 4: III. Brakes: B. Air Brakes: Air Supply and Service Systems (P-1)

Process/Skill Questions:

- What procedure should be performed if oil residue is found in the compressor inlet?
- What conditions may cause the compressor to leak oil or coolant?