Title: Inspect the release (throw-out) bearing, sleeve, bushings, springs, housing, levers, release fork, fork pads, rollers, shafts, and seals.
Course: Diesel Equipment Technology II (20107-II) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking the system for excessive wear
- following manufacturer guidelines for adjustments and lubrication
- determining needed actions.

ASE 3: II. Drive Train: B. Clutch (P-1)

Process/Skill Questions:

- What effect will excessive component wear have on the clutch operation?
- What is the correct adjustment of the throw-out bearing?
- How will fluid leaks affect the clutch operation?