Title: Inspect the electronic wiring harness and brackets.
Course: Diesel Equipment Technology II (20107-II) > Section: Diesel Engines: Servicing the Cylinder Head and Valve Train

Inspection should be made for wear, bending, cracks, and looseness and requires

- performing a visual inspection of wires, connectors, and clamps
- checking the harness with a DMM if the harness and connectors look worn
- securing all harnesses in the proper location and with necessary clamps
- determining the necessary action.

ASE 3: V. Electrical/Electronic Systems: C. Starting System (P-1)

Process/Skill Questions:

- Why are braided wires used in a harness instead of a solid wire?
- What are three types of electrical connectors? What are the pros and cons of each?