Title: Inspect the single-disc clutch pressure plate and clutch disc.
Course: Diesel Equipment Technology II (20107-II) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking the pressure plate and clutch disk for wear, according to manufacturer guidelines
- determining needed actions.

Process/Skill Questions:

- How do the pressure plate and clutch disk operate?
- What are the first signs of a clutch assembly failure?