Title: Inspect the transmission oil filters, coolers, and related components.
Course: Diesel Equipment Technology II (20107-II) > Section: Drive Train: Servicing the Transmission

Inspection should include

- determining the proper oil filter for the application
- looking for oil leaks
- making replacements, as needed.

ASE 5: II. Drive Train: C. Transmission (P-2)

Process/Skill Questions:

- What failure could result from a leaking oil cooler?
- Why is the routing and clipping of oil cooler lines important?
- How should the transmission filler be cut open and the contents inspected during routine maintenance?