Title: Demonstrate the use of thread repair.
Course: Diesel Equipment Technology II (20107-II) > Section: Fastener Repair and Tool Use

Demonstration should include

- Heli-Coil installation
- Nutsert Installation
- Keensert Installation
- E-Z Lok installation.

Process/Skill Questions:

- Why would a thread repair insert be used?
- How does one identify which type of insert to use?