Title: Test the instrument panel, mounted volt meters, and/or indicator lamps.
Course: Diesel Equipment Technology II (20107-II) > Section: Electrical/Electronic Systems: Servicing the Charging System

Testing should include inspecting and testing, based on

- manufacturer guidelines
- a description of normal operation
- the interpretation of appropriate wiring diagrams.

ASE 2: V. Electrical/Electronic Systems: D. Charging System (P-1)

Process/Skill Questions:

- What information does the voltmeter or indicator lamp provide?
- What is the diagnosis procedure if the voltmeter reads lower than normal?