Title: Inspect the clutch linkage, cables, levers, brackets, bushings, pivots, springs, and clutch safety switch.
Course: Diesel Equipment Technology II (20107-II) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking the linkage for wear and the cables for fraying
- checking for missing springs
- determining whether the vehicle will start without the clutch pedal being depressed
- checking the clutch release for stick or bind
- determining needed actions.

ASE 2: II. Drive Train: B. Clutch (P-1)

Process/Skill Questions:

- What are the manufacture-free travel guidelines?
- What is the purpose of the clutch safety switch?
- Where are the lube points on the transmission?