Title: Create a test plan based on specifications.
Course: Engineering Studies (21002) > Section: Applying the Engineering Design Process

Creation should include

- purpose
- methods
- results.

Process/Skill Questions:

- Why is having a test plan important?
- How does the test plan align with real-life working environment?
- How does one prove specifications have been met?
- What are measures of success for each test?