Title: Test the modification/alternative solution, if needed.
Course: Engineering Studies (21002) > Section: Applying the Engineering Design Process

Testing the alternative solution should include

- collecting feedback
- reviewing and evaluating the product and/or process(es) already tested.

Process/Skill Questions:

- What is high-quality or effective feedback?
- Why might one need to review the process or product more than once?
- What does “looping the design process” mean?
- Why are engineers seldom entirely satisfied with the final product or process?