Title: Explain the validity of designing alternative solutions to an engineering design problem or challenge.
Course: Engineering Studies (21002) > Section: Applying the Engineering Design Process

Explanation should include the

- reason multiple solutions are possible and encouraged
- benefits of exploring alternative solutions (one correct answer/process vs. multiple answers/processes).

Process/Skill Questions:

- What is the advantage of generating more than one solution to a problem?
- Is there a right solution to any problem? Explain.
- How are decisions made to narrow down potential solutions?