Title: Interpret diagrams and schematics for pneumatic systems.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Interpretation should include

- the meanings of abbreviations and symbols
- symbols’ relationships to other elements in the diagram or schematic
- related mathematics, such as reading and calculating measurements
- blueprint layout and assembly standards
- adherence to instructions, specifications, and notes.

Interpretation should result in explaining the operation of, making material lists for, and troubleshooting the depicted system.

Process/Skill Questions:

- What symbols are unique to pneumatic system diagrams?
- What mathematical principles can be applied to the understanding of pneumatic systems?
- How are instructions, specifications, and notes indicated on diagrams and schematics?