Title: Inspect pneumatic systems.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Inspection should include a visual inspection of the system to determine a cause of a given problem and should include using a troubleshooting chart and following established procedures to resolve the problem.

Process/Skill Questions:

- What are some resources for established procedures?
- What methods of inspection are best suited for pneumatic systems?