Title: Outline a job safety analysis (JSA).
Course: Industrial Maintenance Technology II (13203-II) > Section: Applying Basic Construction Safety Standards (Core Safety)

Outline should include

- tasks performed
- hazards present
- mitigation of hazards.

Teacher Resource: Job Safety Analysis (form), National Safety Council

Process/Skill Questions:

- Why is a JSA important?
- Why are JSAs specific to the various tasks being performed?