Title: Install a power supply.
Course: Cybersecurity Systems Technology (10109-III) > Section: Troubleshooting Hardware and Networking

Installation should be based on given specifications and should include

- connector types and their voltages
  - SATA
  - Molex
  - 4- or 8-pin 12v
  - PCIe 6- or 8-pin
  - 20-pin
  - 24-pin

- specifications
  - wattage
  - dual rail
  - size
  - number of connectors
  - ATX
  - MicroATX
  - dual voltage options

- redundancy options
- Ohm’s law.

Process/Skill Questions:

- Why are redundancy options important?
- What is Ohm’s law?
- What are the purposes of the various power supply connectors?
- What are the three common voltages for power supply?
- What is the purpose of a power supply?