Title: Demonstrate establishment of incident management.
Course: Emergency Medical Technician II (14055-II) > Section: Understanding EMS Operations

Demonstration should include

- establishing and working within the incident management system
- understanding the principles of crew resource management.

Note: It is a requirement that the instructor teach the Virginia MCIM-1 course.

Process/Skill Questions:

- What are three questions to ask when first arriving at a mass-casualty incident?
- Who establishes incident command?
- How does an EMT initiate incident command?

Teacher Resource:

- ICS 100, 200, 700, 800 requirements from the Federal Emergency Management Agency