Title: Evaluate a multiple-casualty incident.
Course: Emergency Medical Technician II (14055-II) > Section: Understanding EMS Operations

Evaluation should include

- operational goals
- field triage
- destination determination
- treatment principles.

Note: the extent of information presented in this area will vary at the regional and local level.

Note: It is a requirement that the instructor teach the Virginia MCIM-1 course.

Process/Skill Questions:

- What is an EMT's role during a multiple-casualty situation?
- How does an EMT perform triage and re-triage?
- What is post-traumatic stress? What is cumulative stress?
- What is resource management? How does an EMT apply it?