Title: Describe the care of neonatal patients.
Course: Emergency Medical Technician II (14055-II) > Section: Managing Special Patient Populations

Description should include

- neonatal stabilization
- neonatal resuscitation.

Process/Skill Questions:

- When should the Apgar score be calculated?
- What is the correct way to stimulate a neonatal patient to breathe?
- What are the procedures for neonatal resuscitation?