Title: Explain electrician-specific safety issues.
Course: Electricity I (17102-I) > Section: Focusing on the Electrician's Profession

Explanation should include

- reasons why safety is important
- key factors involved in ensuring safe work practice
- types of legal and illegal drugs and their effects on worker productivity and safety

in accordance with industry standards and instructor guidelines.

Process/Skill Questions:

- How do drugs affect job performance?
- How does safety affect deadlines and on-job scheduling?
- How does reckless behavior affect one’s life beyond the job?