Title: Identify national and local trade organizations.
Course: Electricity I (17102-I) > Section: Focusing on the Electrician's Profession

Identification should include

- SkillsUSA (how to become a member and participate as a team member)
- unions and local apprenticeships.

Process/Skill Questions:

- What are the meanings of the following acronyms:

  - ABC
  - JATC
  - CVECA
  - IEC
  - ETA
  - DPOR
  - NABCEP
  - NIECT
  - BICSI

  - NCCER
  - NOCTI
  - IBEW
  - IBC
- What are the benefits of membership in the student and trade organizations?
- What are the objectives of apprenticeship programs?