Title: Measure distances using scales and measuring devices.
Course: Electricity I (17102-I) > Section: Solving Mathematical Problems Related to the Electrical Field

Measurement should include

- using various scales and drawing specified lines to length (e.g., 1/8" = 1’0", 1/4" = 1’0")
- using ruler to measure distances assigned to the nearest 1/16"

in accordance with instructor guidelines.

Process/Skill Questions:

- How is "one quarter to a foot" expressed in mathematical terms?
- How many scales are on an architect's scale?
- Why is understanding measuring devices important in electricity?