Title: Demonstrate scaffolding techniques.
Course: Electricity I (17102-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Demonstration should include inspecting settings, duty ratings, and safety tags.

Process/Skill Questions:

- How can one determine the weight limit of any particular scaffolding?
- In what situations is scaffolding preferred or required?