Title: Use tools and software for preventive maintenance.
Course: Computer Systems Technology II (10002-II) > Section: Demonstrating Preventive Maintenance and Troubleshooting

Use should include hardware, software, and other advanced tools.

Process/Skill Questions:

- What software is often used during preventive maintenance?
- What test equipment can be used for troubleshooting computer problems?
- What software tool generally improves storage devices’ performance?
- What are some software tools built into operating systems that improve  system performance?