Title: Describe physical and technical security procedures.
Course: Computer Systems Technology II (10002-II) > Section: Performing Security Functions

Description should include

- requirements of a basic local security policy
- the tasks required to protect physical equipment
- ways to protect data
- encryption settings for wired and wireless networks
- password policies
- wireless security techniques.

Process/Skill Questions:

- Why would having a local security policy benefit the business, technician, and end-user?
- What security issues are unique to wireless environments?