Title: Maintain audio and video equipment.
Course: Television and Media Production I (11103-I) > Section: Production: Managing Equipment

Maintenance should include

- storage
- handling
- cleanliness
- safety.

Process/Skill Questions:

- How should tripods and cameras be transported?
- How should cameras be cleaned?
- How should cameras be stored?
- What are the consequences of mishandling or damaging equipment that belongs to others?