Title: Interpret common abbreviations used in immunology/serology.
Course: Medical Laboratory Technology II (14102-II) > Section: Understanding the Basics of Immunology/Serology

Interpretation should include abbreviations and acronyms associated with medical testing.

Process/Skill Questions:

- What is the difference between an IFA and DFA?
- What is IgE?
- What is an ELISA?
- What is an agglutination test?