Title: Perform or simulate an antigen and antibody reaction in transfusion medicine.
Course: Medical Laboratory Technology II (14102-II) > Section: Understanding the Basics of Immunohematology/Transfusion Services

Performance or simulation should include

- ABO typing
- Rh typing.

Process/Skill Questions:

- What is the significance of Rh negative?
- What is the significance of Rh positive?
- What influences the Rh positive?