Title: Test a drainage system by performing a standing water test.
Course: Plumbing II (17058-II) > Section: Installing Waste and Soil Pipes

Testing is performed according to instructor's guidelines, following procedures according to the Plumbing Code.

Process/Skill Questions:

- How much head pressure is required for an accurate water test?
- How are open lines sealed?
- Who oversees and checks the water test?