Title: Create a proposal for an engineering project.
Course: Engineering Concepts and Processes III (21005-II-36) > Section: Applying Project Management Skills to an Engineering Design Project

Creation should include

- persuasive, informative, clear, concise proposal
- introduction
- statement of the problem
- objective or thesis
- method of attack/rhetorical strategy
- alternatives
- justification
- resources
- evaluation
- budget
- appendix.

Process/Skill Questions:

- What is an engineering proposal?
- What are the steps when creating an engineering proposal?
- What is a real-world example of an engineering proposal?