Title: Interpret constructive feedback.
Course: Engineering Concepts and Processes III (21005-II-36) > Section: Functioning as a Team on an Engineering Project

Interpretation should include applying the following rules for receiving constructive criticism:

- Keep quiet.
- Listen objectively.
- Remain open to accepting feedback and input.
- Remain confident.
- Acknowledge the criticism and use it to improve performance.

Process/Skill Questions:

- How is constructive criticism used to improve performance?
- When does constructive criticism cause team dysfunction?
- What would cause a team member to become defensive?