Title: Describe management of the desktop environment.
Course: Computer Information Systems (10005-I) > Section: Managing Computer Systems

Description includes system resource maintenance methods such as

- creating and deleting shortcuts/aliases to software
- deleting temporary files
- managing browser history
- managing cookie files
- utilizing the task manager
- managing the recycle bin.