Title: Demonstrate safe use of lighting equipment.
Course: Entertainment Design and Technology (05056-III) > Section: Understanding Lighting Technology

Demonstration may include

- hanging techniques
- focusing
- accessory use
- maintenance and repair
- cable management
- troubleshooting techniques
- dimming system operation
- control system operation (e.g., patching, cueing, editing).

Process/Skill Questions:

- What is the procedure to replace a lamp?
- How do you find a hotspot on an instrument?