Title: (Optional) Identify basic electrical concepts.
Course: Entertainment Design and Technology (05056-III) > Section: Understanding Basic Electricity

Identification should include

- AC/DC
- circuitry (e.g., power, communication)
- power requirements
- efficiency and conservation
- heat management.

Process/Skill Questions:

- What are the differences between power circuits and communication circuits?
- What is the relationship between power and load?
- What are the uses of various electrical circuit types?
- What are the differences between AC and DC? When would you use one over the other?