Title: Perform postoperative cleanup procedures.
Course: Surgical Technologist II (14056--II) > Section: Demonstrating Postoperative Procedures

Performance of postoperative cleanup procedures should include

- the transfer of contaminated instruments to special containers
- the disposal of drapes and table cover in proper receptacle
- the return of unused equipment and supplies to proper place
- the cleaning of the operating room.

Process/Skill Questions:

- What steps should be included in the wipe-down of the operating room? What products and equipment are necessary for the wipe-down?
- Who is responsible for postoperative cleanup? Why?
- What types of biohazardous materials may need to be disposed of separately from linens and other waste? What is the proper procedure for disposing of these biohazardous materials?