Title: Demonstrate the safe use of fire protection equipment.
Course: Small Engine Technology I (20110-I) > Section: Applying Safety Practices on the Job

Demonstration should include

- different types of fires encountered in the automotive technology field (Class A, B, C, and D)
- appropriate types of extinguishers to use with each fire
- hazards and the precautions associated with each
- fire emergency procedures that follow government regulations and instructor’s guidelines
- fire safety awareness and safety precautions to prevent fires.

Process/Skill Questions:

- What are the different types of fire extinguishers?
- What types of fire extinguishers are appropriate for what types of fires?
- What procedure should students follow in case of an emergency or accident?