Title: Service the crankcase ventilation system.
Course: Small Engine Technology I (20110-I) > Section: Understanding Lubrication Systems

Servicing should include

- identifying the components of the crankcase ventilation system
- servicing the crankcase breather assembly.

Process/Skill Questions:

- What are the benefits of positive crankcase ventilation?
- What is the function of a breather hose?