Title: Use technical publications.
Course: Small Engine Technology I (20110-I) > Section: Performing Lab Operations

Use should include

- the types of technical publications (e.g., safety/operation, parts/maintenance, service/technical manual, instruction sheets, equipment setup manual, predelivery inspection sheets, service/repair bulletins),
- the formats of manuals (e.g., printed, electronic)
- the methods of locating information in them (e.g., table of contents, index, unique numbering systems).

Process/Skill Questions:

- Will one manual answer questions for all small engines?
- Why use a service manual?
- How can troubleshooting charts be helpful, and what kinds of information do they contain?
- Where would torque specifications be found?