Title: Analyze airfoil test results.
Course: Aerospace Technology II (21055-II) > Section: Designing Aircraft

Analysis should include

- changing parameters independently
- measuring lift and drag
- conducting a material analysis
- locating the center of gravity/determining balance.

Process/Skill Questions:

- What is the correlation between lift and drag in the test results?
- What wing design characteristics had the most effect on the wings’ ability to produce lift during testing?