Title: Repair circuits.
Course: Unmanned Aircraft Systems, Advanced (20905 ii) > Section: Troubleshooting and Repairing

Repair should include

- soldering
- using a multimeter
- attaching a wire harness
- testing, troubleshooting, and repairing UAS radio command, telemetry, and data links.

Process/Skill Questions:

- How does static electricity affect the performance of printed circuit boards?
- How is a multimeter used?