Title: Identify tools, their care and maintenance needs, their functions, and handling.
Course: Aviation Maintenance Technology II (20114-II) > Section: Following Tool and Equipment Safety and Care Guidelines

Identification should include

- naming hand tools, power equipment, and additional lab equipment used in aviation maintenance
- selecting the appropriate tool for the job
- following manufacturer's guidelines for cleaning, maintaining, and storing tools
- calibrating tools
- understanding of precision measurement tools, principles, and procedures.
- understanding of torquing tools, principles, and procedures.

ACS:

AM.I.E.K1
AM.I.E.K4
AM.I.E.K6
AM.I.E.K8

Process/Skill Questions:

- Why is tool calibration important?
- What tools are common to aviation maintenance?