Title: Syllabus
Course: Medical Coding and Billing I (14151-III)

Copyright: 2021

Virginia Assignment Code: 8388

Suggested Grade Level: 11, 12

Duration: 36 weeks

Hours: 140

Credits: 1

Prerequisites: None

CTSO: HOSA-Future Health Professionals

Course Description:

Students will be introduced to healthcare systems, management of an office, and the electronic medical record (EMR) as it pertains to the field of medical coding and billing. Students will be introduced to the field of health informatics as well as medical terminology used to describe human anatomy and physiology. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/health-science/medical-coding-and-billing-i/