Title: Identify the components and systems of a building.
Course: Interior Design II (19263-II) > Section: Understanding Construction

Identification should include

- foundation
- floor
- walls (load-bearing vs. non-load-bearing)
- windows and doors
- lighting and electrical
- heating, ventilation, and air conditioning (HVAC)
- plumbing
- mechanical
- roof.

Process/Skill Questions:

Thinking

- What methods can be used to assess the relative merits of various materials?
- What environmental factors may influence the assessment of a material?
- What are the mechanical systems in the building?  How do they interconnect?
- What are the local code requirements for electrical and mechanical systems, especially as they relate to interior design?

Communication

- What communication skills are necessary to assess a variety of exterior finishing materials?
- How can one communicate assessment standards or local code requirements to a client?

Leadership

- How can environmental influences be considered when assessing building materials?
- What governmental/industry regulations are associated with building?

Management

- What strategies will help when selecting materials for a building?
- How can an interior design professional manage a client’s wishes about the components and systems of a building in view of the requirements of local codes?