Title: Complete a nationally recognized certification for first aid.
Course: Sports Medicine/Athletic Training I (14062-I) > Section: Obtaining First Aid and CPR/AED Education

Completion should include the fulfillment of course requirements, including the hands-on portion of a nationally recognized first-aid certifying organization, such as the American Heart Association.

Process/Skill Questions:

- When is it appropriate to perform cardiopulmonary resuscitation (CPR)? Use an automatic external defibrillator (AED)?
- What are the essential components of performing CPR? Using an AED?
- How does the level of medical training affect the responsibility to react in a medical emergency?
- How does the Good Samaritan law affect a responder?
- What are the steps when caring for an open wound?