Title: Prepare exterior elevations.
Course: Drafting, Advanced (21102-IV) > Section: Performing Architectural Drafting and Design Operations with Extensive Use of CADD

Preparation should include

- setting the scale of the drawing
- using the floor plan to project horizontal lengths of exterior walls, doors, windows, and other elements
- using the wall section to project heights of the grade line, depth and thickness of footings, door and window heights, eaves line, and roof height
- adding details such as railing, window muntins, trim, window wells, and gable ventilators
- adding dimensions, notes, and symbols
- identifying each elevation as front, right, left, or rear (or north, south, east, or west) immediately below the drawing
- identifying grade lines and finished floor and ceiling levels
- identifying roof features, such as slope, and chimney height and size.

Process/Skill Questions:

- What is the primary purpose of an elevation drawing?
- What are some consequences of incorrect identification or location of grade lines?
- How is the floor plan used in preparation of an elevation?