Title: Use reference materials.
Course: Drafting, Advanced (21102-IV) > Section: Performing Mechanical Drafting and Design Operations with Extensive Use of CADD

Use may include

- American National Standards Institute (ANSI) manuals
- International Standards Organization (ISO) manuals
- building code manuals
- machinist handbooks
- textbooks.

Process/Skill Questions:

- When might it be necessary to consult reference material?
- What are some successful methods of using reference materials?