Title: Identify common hand and power tools.
Course: Building Trades I (17009-I) > Section: CORE CONSTRUCTION SKILLS: Applying Fundamental Construction Skills

Identification could include

- naming various hand and power tools
- stating the use of each tool
- citing the maintenance associated with each tool
- safely using tools in accordance with the manufacturer instructions, government regulations, and instructor guidelines.

Process/Skill Questions:

- What tools might be kept in the tool belt vs. on the truck?
- How often should a tool be inspected?
- What is the difference between a two-wire and a three-wire cord on a power tool?