Title: Identify personal protective equipment (PPE) requirements.
Course: Building Trades I (17009-I) > Section: CORE CONSTRUCTION SKILLS: Applying Basic Construction Safety Standards (Core Safety): Electricity I

Identification should include procedures for putting on, wearing, and removing PPE and inspecting PPE to determine whether it is safe to use. (Appropriate PPE may include eye protection, respirator, hard hat, gloves, safety harness, hearing protection, and safety shoes).

Process/Skill Questions:

- What are dangerous effects of sun exposure, and how can these risks be significantly diminished?
- Why is wearing jewelry prohibited while in the lab or on the job site?