Title: Identify local, state, and federal regulations for a tradesman license.
Course: Building Trades I (17009-I) > Section: CORE CONSTRUCTION SKILLS: Understanding Local, State, and Federal Regulations

Identification should include the varying regulations within the local, state, and federal levels for a tradesman license.

International Residential Code (IRC): Chapter 1, sections R101 thru R114, identifies the requirements and specifications for permit applications, required construction documents, and responsibilities of parties involved in residential construction.

Process/Skill Questions:

- Who regulates tradesmen in Virginia?
- What are the specialty areas for a tradesman license in Virginia?