Title: Calculate fitting allowance.
Course: Building Trades I (17009-I) > Section: PLUMBING: Performing Plumbing Basics

Calculations should be accurate to within +/- 1/16 inch.

IRC: Chapter 27 covers fixture installations.

Process/Skill Questions:

- Why is a fitting allowance necessary in a fitting project?
- How is takeoff calculated for a fitting allowance?