Title: Comply with federal, state, and local safety legal requirements.
Course: Building Trades I (17009-I) > Section: CORE CONSTRUCTION SKILLS: Applying Basic Construction Safety Standards (Core Safety): Electricity I

Compliance should include the identification of the Hazard Communication Standard (HazCom), the information included on safety data sheets (SDS), and the responsibilities of employers and employees under HazCom.

Compliance should also include requirements from Occupational Health and Safety Administration (OSHA), Virginia Occupational Safety and Health (VOSH), and Environmental Protection Agency (EPA).

Process/Skill Questions:

- Where should hazardous materials be stored?
- What information can be found on an SDS?