Title: Describe how field inspections and observations are used to ensure quality on a project.
Course: Masonry II (17008-II) > Section: Exploring Construction Inspection and Quality Control

Description should include

- why and how standards and codes inspections are performed
- why and how materials inspections are performed
- observations that are undertaken during construction
- why and how construction tolerances are monitored.

Process/Skill Questions:

- What is the purpose of inspections?
- How are inspections conducted?
- Who is responsible for inspections?
- How are inspections arranged?