Title: Build a composite wall system.
Course: Masonry II (17008-II) > Section: Constructing Commercial Masonry

Building should include

- laying out and constructing, according to specifications
- a 12-foot composite wall, using 8-inch block and a single wythe of brick
- reinforcements, meeting all local building codes.

Teacher Resource: 1926.706 - Requirements for masonry construction, OSHA

Process/Skill Questions:

- What scaling system is used for composite wall construction?
- What are the components of a composite wall?