Title: Build a cavity wall system.
Course: Masonry II (17008-II) > Section: Constructing Commercial Masonry

Building should include

- laying out and constructing, according to specifications
- a 12-foot cavity wall, using 8-inch block and a single wythe of brick
- reinforcements, meeting all local building codes
- insulation that meets energy standards.

Process/Skill Questions:

- What scaling system is used for cavity wall construction?
- What are the components of a cavity wall?