Title: Build a block corner.
Course: Masonry II (17008-II) > Section: Laying Concrete Masonry Units

Building should include corners laid out in 90-degree orientation, plumb and level, while stepping block back 8 inches on each tail and maintaining a 3/8-inch thickness in the joint.

Process/Skill Questions:

- What is the difference between 8-inch, 10-inch, and 12-inch corners when examined from the exterior?
- Why should a corner be ranged?