Title: Install horizontal joint reinforcements.
Course: Masonry II (17008-II) > Section: Constructing Commercial Masonry

Installation should include composite cavity wall, including horizontal joint reinforcements, built according to engineering specifications.

Process/Skill Questions:

- What type of wire should be used for exterior joint reinforcement?
- What are the vertical spacing requirements for wire reinforcement?
- What distance must be maintained between high-voltage electrical lines and any materials or equipment?