Title: Describe how mortar is tested to ensure quality on a project.
Course: Masonry II (17008-II) > Section: Exploring Construction Inspection and Quality Control

Description should include

- sand tests
- mortar consistency tests
- brick absorption tests
- lab tests.

Process/Skill Questions:

- Why is it important to test mortar?
- What is a sand test? How is it performed?