Title: Describe how standards and specifications are used to ensure quality control throughout the masonry industry.
Course: Masonry II (17008-II) > Section: Exploring Construction Inspection and Quality Control

Description should include

- masonry units
- mortar
- grout
- accessories
- lab and field testing of masonry construction.

Process/Skill Questions:

- Why is testing necessary?
- What is the purpose of using grout?
- What is the American Society for Testing and Materials (ASTM)? Why is it important for masonry?