Title: Identify PPE for various collision repair tasks.
Course: Collision Repair Technology I (21117-I) > Section: Practicing Safety

Identification should include following manufacturer warning and guidelines regarding procedures and precautions. Identification should include PPE such as

- gloves
- suits
- hoods
- eye protection
- ear protection

for collision repair tasks such as

- surface preparation
- spray-gun and related equipment operation
- paint mixing, matching, and application
- addressing paint defects
- detailing.

Process/Skill Questions:

- How do toxic chemicals enter the body?
- What tools are the noisiest, and how is hearing loss prevented?