Title: Identify safety equipment used on a construction site.
Course: Utility/Heavy Construction I (20052-I) > Section: Practicing Safety

Identification should include

- fire extinguisher
- personal protective equipment (PPE)
- cutoff/kill switch for equipment
- first aid kit
- safety data sheets (SDS)
- protective systems for trenching
- backup alarms
- utility marks
- portable gas monitors.

Process/Skill Questions:

- How would one conduct a precheck of equipment?
- How would one conduct a site inspection prior to excavation?