Title: Identify ground guide hand signals used on a construction site.
Course: Utility/Heavy Construction I (20052-I) > Section: Practicing Safety

Identification should include

- stop
- directional
- emergency.

Process/Skill Questions:

- What is the importance of knowing ground guide hand signals?
- What is the importance of maintaining visibility between the operator and the person using the hand signals?
- Why should one constantly review current hand signals?