Title: 8616 8617 Acknowledgments and Copyright
Course: Utility/Heavy Construction I (20052-I) > Section: ADDITIONAL COURSE INFORMATION

Copyright © 2024

The components of this instructional framework were developed by the following curriculum development panelists:

Chad Baker, Maintenance Training Academy Director, Virginia Department of Transportation, Richmond
Jessica Blythe, Special Projects Coordinator, Mathers Construction Company, Waynesboro
Justin Embrey, Human Resources Specialist, Sargent Corporation, Richmond
Brandon Eubank, Instructor, Goochland High School, Goochland County Public Schools
Caleb Lamont, Learning Program Supervisor, Virginia Department of Transportation, Richmond
Jawaun Porter, Instructor, The College & Career Academy at Pruden, Suffolk City Public Schools
Joyce Price, State Director, SkillsUSA Virginia, Blacksburg
Christopher Terry, Vice President of Construction & Real Estate, Waynesboro

Correlations to the Virginia Standards of Learning were reviewed and updated by the following:

Leslie R. Bowers, English Teacher (ret.), Newport News Public Schools
Vickie L. Inge, Mathematics Committee Member, Virginia Mathematics and Science Coalition
Anne F. Markwith, New Teacher Mentor (Science), Gloucester County Public Schools

The framework was edited and produced by the CTE Resource Center:

Debi F. Coleman, Writer/Editor
Kevin P. Reilly, Administrative Coordinator

Virginia Department of Education Staff

Lauren-Anne Sledzinski, Specialist, Trade and Industrial Education and Related Clusters
Kelly C. Davis, Associate Director, Curriculum, Instruction, and Innovation
Dr. J. Anthony Williams, Director

The CTE Resource Center is a grant project of the Virginia Department of Education, Office of Career, Technical, and Adult Education, and is administered by Henrico County Public Schools, Department of Career and Technical Education.

The Virginia Department of Education does not discriminate on the basis of race, sex, color, national origin, religion, sexual orientation, gender identity, age, political affiliation, or against otherwise qualified persons with disabilities. The policy permits appropriate employment preferences for veterans and specifically prohibits discrimination against veterans. The following position has been designated to handle inquiries regarding the Department's non-discrimination policies:

Deputy Superintendent - Finance and Operations
Virginia Department of Education
P.O. Box 2120
Richmond, Virginia 23218-2120
Phone: 804-225-2025

For further information on federal non-discrimination regulations, contact the Office for Civil Rights at OCR.DC@ed.gov or call 1-800-421-3481.