Title: Identify the possible hazards in underground utilities.
Course: Utility/Heavy Construction I (20052-I) > Section: Practicing Safety

Identification should include

- different color code systems for utilities
- private utilities
- Miss Utility.

Process/Skill Questions:

- What is Virginia 811?
- Why is it important to avoid utilities?
- What are the two most dangerous types of utilities?