Title: Syllabus
Course: Utility/Heavy Construction I (20052-I)

Copyright: 2024

Virginia Assignment Code: 8616

Suggested Grade Level: 10, 11

Duration: 36 weeks

Hours: 140

Credits: 1

Prerequisites: None

CTSO: SkillsUSA

Course Description:

This program introduces the field of earthwork, soil classifications, utility and heavy equipment operation, and related technologies. Students learn about safety, site grading and development, excavation, drainage and utility structures, and pipe laying. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Note:

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," or contact the Virginia Department of Education Office of Career, Technical, and Adult Education at cte@doe.virginia.gov.

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/architecture-construction/17546/