Title: Describe computer hardware, software, networks, and the basic structure of the Internet.
Course: Global Logistics and Enterprise Systems I (20151-I) > Section: Navigating Enterprise Resource Planning (ERP) Systems

Description should include the following components:

- Hardware
  - Internal devices
    - Power supply
    - Cards
    - Memory

  - Peripheral devices
    - Printer
    - Scanner
    - External Hard Drive

  - Mobile Devices

- Software
  - Windows
  - Unix
  - Linux
  - Android

- Networks
  - Wired
    - Switches vs Routers

  - Wireless (Wi-Fi)
    - IEEE 802.11 protocol
      - 802.11a, 802.11b/g/n, and 802.11ac

  - LAN (local area network)
  - WAN (wide area network)

- Basic Structure of the Internet
  - Network of networks
  - Internet Protocol
    - TCP/IP
      - Addresses (e.g., http)

  - Packets
  - Client/Server
  - Cloud

- Satellite