Title: Develop experimental procedures to solve a problem or answer a question as it relates to the agriculture industry.
Course: Biological Applications in Agriculture (18308-I) > Section: Understanding the Study of Living Things

Development should include

- basing the procedure on an experimental design diagram
- communicating findings in written form, using the scientific method or engineering design process as a guide.

Process/Skill Questions:

- How might an experimental design diagram be used when planning an experiment on plant growth and development?
- How does one determine the type of data to be collected? What visuals might be used to display the data for analysis?
- What information should be included in the laboratory report?