Title: Ventilate harmful vapors from a confined area.
Course: Building Management I (16103-I ) > Section: Measuring and Mixing Chemicals

Ventilation should include

- selecting PPE and equipment
- opening exterior doors and windows as needed to introduce outside air
- using fans to remove harmful vapors
- locating mechanical exhaust equipment and turning it on when harmful vapors are present.

Process/Skill Questions:

- Why is the correct PPE important when working around harmful vapors in a confined area?
- What are the differences between particle masks and respirators?
- What are some examples of confined areas or spaces that might be encountered in building management?
- What are the relevant safety precautions and procedures to follow when ventilating vapor from a confined area?
- What tools may be helpful in ventilating an area?
- Why is it important to have the ventilated area inspected by the fire department?