Title: Reset the timing devices.
Course: Building Management I (16103-I ) > Section: Demonstrating Electrical Maintenance of Buildings

Resetting should include

- ensuring the equipment is turned off (if applicable)
- setting the appropriate time
- turning on the equipment (if applicable).

Process/Skill Questions:

- What are the relevant safety precautions/procedures for operating timing equipment?
- What are the tools used to operate timing equipment safely?
- What is the immediate danger of adjusting the timing equipment?