Title: Clean the condenser on a refrigeration unit.
Course: Building Management I (16103-I ) > Section: Maintaining Building Interiors and Exteriors

Cleaning should include

- selecting PPE and equipment
- removing dirt, dust, and grime from the condenser, allowing proper airflow in the refrigeration unit.

Process/Skill Questions:

- What safety precautions should be followed when cleaning a condenser?
- What PPE should be worn when using chemical solvents or cleaners?
- Why is it necessary to clean a refrigeration condenser unit?