Title: Perform safety inspections of all equipment and accessories.
Course: Welding II (13207-II) > Section: Demonstrating Gas Tungsten Arc Welding (GTAW)

Performance should include a visual inspection of the following GTAW equipment and accessories on a daily basis, in accordance with the instructor's or employer's policy:

- Regulator
- Hoses
- Welding leads (e.g., gun, torch, work cable)