Title: Explain the physical operation of electromagnetic components in a mechatronic system.
Course: Mechatronics II (13901-II) > Section: Understanding Electrical Components in a Mechatronic System

Explanation should incorporate the use of technical documentation and may include components such as coils, solenoids, relays, and various sensors.

Process/Skill Questions:

- What is the role of a flyback (snubber) diode?
- What are the most common causes of failure with solenoids? How are problems identified?
- What are the different types of relays?