Title: Consult technical documents to assess a mechatronic system and troubleshoot malfunctions in electrical components.
Course: Mechatronics II (13901-II) > Section: Using Technical Documents

Consultation should include

- data sheets
- timing diagrams
- operating manuals
- schematics.

Process/Skill Questions:

- When should technical documents be consulted?
- Why is a line diagram usually easier to use for troubleshooting than a wiring diagram?