Title: (Optional) Explain fluid-power system maintenance.
Course: Mechatronics II (13901-II) > Section: Understanding Fluid Power (Hydraulics and Pneumatics)

Explanation should include referencing service manuals for installation, as well as preventive maintenance techniques, for fluid-power systems.

Process/Skill Questions:

- What are common breakdown points in a fluid-power system?
- What routine maintenance functions should be performed on a pneumatic or hydraulic system?
- What is the benefit of a maintenance program?