Title: Construct fluid-power systems from components and symbols.
Course: Mechatronics II (13901-II) > Section: Understanding Fluid Power (Hydraulics and Pneumatics)

Construction should include connecting a supply element to a control device and an actuator and describing how the system functions. Construction should also include reading and interpreting symbols and diagrams.

Process/Skill Questions:

- What components are required for a basic fluid-power system?
- Why does the system perform or not perform as expected?