Title: Identify motor controllers.
Course: Electronics Systems III (17106-III) > Section: Introducing Motor Controllers

Identification should include

- passive motor controllers (control the motor)
- smart controllers (sensor inputs)
- mechanical controllers (screen door closer)
- basic damping effects.

Process/Skill Questions:

- Why is it necessary to understand the role of motor controllers?
- How do smart controllers work?
- What are basic damping effects?