Title: Describe complex direct current (DC) circuits.
Course: Electronics Systems III (17106-III) > Section: Analyzing Microprocessors

Description should include

- Kirchhoff’s laws
- network theorems
- voltage dividers
- current dividers
- nodes, meshes, and branches methods.

Process/Skill Questions:

- How are voltage and current values controlled in a complex DC circuit?
- What are the steps to redrawing a complex schematic?
- What are the pros and cons of simplifying a complex circuit?