Title: Apply safety guidelines in appropriate circumstances.
Course: Energy and Power (20101-18) > Section: Introducing Safety in Energy and Power

Application should include

- OSHA guidelines for construction (29 CFR 1926) and general industry (29 CFR 1910)
  - personal protective equipment (PPE)
  - lockout/tagout procedures
  - guidelines relating to confined space
  - hearing protection
  - respiratory protection
  - work permits
  - guidelines relating to hazardous waste and materials
- manufacturer guidelines for maintenance and use of tools, shop equipment and equipment maintaining lab safety
- conduct testing, calibration, and measurement requirements
- National Electrical Code (NEC) National Fire Protection Association (NFPA 70)
- American Society of Mechanical Engineers (ASME) codes
- National Board of Boiler and Pressure Vessel Inspectors (NBBI) codes
- US Chemical Safety and Hazard Investigation Board (CSB) Videos
- US Department of Transportation Natural Gas Pipeline Fatigue Management Mitigation Program
- Federal Pipeline Safety Regulations.

Process/Skill Questions:

- What are some OSHA guidelines for safety?
- What safety guidance does ASME provide?
- What is an audiogram?