Title: Apply relaxer.
Course: Master Barber II (Three-year Program) (19002-II) > Section: Performing Chemical Relaxing

Application should be performed according to manufacturer specifications and should include the following guidelines:

- Read and follow manufacturer specifications for the application of a chemical relaxer.
- Apply relaxer to hair shaft.
- Perform periodic strand test.
- Rinse relaxer from hair with cool water with a steady flow of water away from the scalp.
- Shampoo hair with a neutralizing shampoo as directed by the manufacturer.
- Recondition the hair.
- Towel dry the hair.
- Re-examine the scalp.
- Style as desired by client.

Process/Skill Questions:

- Why is it important to read and follow manufacturer specifications for the application of a chemical relaxer?
- How is relaxer applied to the hair?
- Why should the scalp be re-examined?
- What is the total amount of time a relaxer should be left on the hair?
- What is the purpose of neutralizing shampoo?
- What should be done with relaxer left over after a service?