Title: Describe aircraft inspection regulations.
Course: Aircraft Pilot Training I (20053-I) > Section: Identifying Aircraft Maintenance Regulations

Description should include the following:

- Under 14 CFR § 91, the primary responsibility for maintaining an aircraft in an airworthy condition falls on the owner or operator of the aircraft.
- Certain inspections must be performed on the aircraft, and the owner must maintain the airworthiness of the aircraft during the time between required inspections by having any defects corrected.

PLT372

Process/Skill Questions:

- What is the owner’s responsibility regarding airworthiness?