Title: Inspect course-specific hand and power tools to visually identify defects.
Course: Carpentry I (17003-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Inspection of tools should include

- identifying components of machinery (e.g., guards, blades, moving parts, start/stop switches)
- identifying standard safety procedures (i.e., lab practices and manufacturer recommendations)
- observing a demonstration of the safe operation and use of each piece of machinery in the lab
- identifying tool defects.

Process/Skill Questions:

- What are some of the basic power tools used in construction?
- What are the proper actions to take before using a circular saw?
- Why should a power tool always be grounded?

NCCER Core: Introduction to Basic Construction Skills

Module 00101 Basic Safety (Construction Site Safety Orientation) explains the importance of safety in construction and industrial crafts. Trainees will learn how to identify and follow safe work practices and procedures and how to properly inspect and use safety equipment. Trainees will be able to describe the safety practices associated with elevated work; energy release; and various hazards encountered on job sites.

NCCER Core: Introduction to Basic Construction Skills

Module 00103 Introduction to Hand Tools instructs trainees in the identification, use, and care of hand tools. Developing the knowledge to properly choose and safely use hand tools is an essential part of the construction industry. Provides detailed descriptions of the hand tools and portable power tools used by carpenters. Emphasis is on safe and proper operation of tools, as well as care and maintenance.