Title: Prepare surgical instruments.
Course: Medical Assistant II (14151-II) > Section: Assisting with Minor Surgical Procedures

Preparation should include surgical instruments such as

- forceps
- clamps
- needle holders
- scalpels
- scissors

and include the handling of instruments.

Process/Skill Questions:

- What are the most common surgical instruments used in minor surgical procedures? What is the function of each instrument?
- What precautions must be taken when handling surgical instruments?
- How should surgical instruments be cared for?