Title: Inspect the locations of all suspension, steering, and powertrain component attachment points on the vehicle.
Course: Collision Repair Technology III (20117-III) > Section: Analyzing Unibody and Unitized Structure Inspection, Measurement, and Repair

Inspection should include

- bolts and fasteners
- insertion points for bolts or fasteners
- welds, sealers, and corrosion protection damage
- bent or kinked panels
- misaligned or twisted powertrain mounts.

Process/Skill Questions:

- Where are attaching points?
- Why are attaching points important?
- What are the steps to inspect attaching points?