Title: Perform safety inspections of all equipment and accessories.
Course: Welding I (13207-I) > Section: Demonstrating Gas Metal Arc Welding (GMAW)

Performance should include a visual inspection of the following GMAW and GMAW-S equipment and accessories on a daily basis, in accordance with the instructor's or employer's policy:

- Regulator
- Hoses
- Welding leads (e.g., gun, torch, ground cable)