Title: (Optional) Perform safety inspections of all equipment and accessories.
Course: Welding I (13207-I) > Section: Demonstrating Thermal Cutting

Performance should include a visual inspection of the following OFC track burner equipment and accessories on a daily basis, in accordance with the instructor's or employer's policy:

- Hoses
- Cords
- Gauges