Title: (Optional) Review keyboarding techniques.
Course: Office Specialist II - Preparation (12004 - II) > Section: Enhancing Keyboarding and Computer Skills

Review should include

- positioning the body
- positioning the feet
- using proper wrist and finger position
- keyboarding by touch and without pauses
- spacing quickly
- using special keys
- using the mouse
- keeping fingers curved and upright over keys
- keeping eyes on copy and screen as necessary
- entering data by touch at a progressive speed and with progressive accuracy
- exploring assistive technologies as necessary.