Title: Service the starting circuit.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Service should follow manufacturers specifications and instructor's guidelines and include checking the

- ignition switch
- wiring
- fuses
- safety switches
- starter solenoid
- battery cables
- ground straps.

Process/Skill Questions:

- Why is using the correct procedure important in troubleshooting electrical starting circuit problems?
- What potential problems could develop from improper troubleshooting of a starting circuit problem?
- How could improper diagnosis of a starting circuit problem lead to customer dissatisfaction?