Title: Identify the location and use of industry-accepted safety devices.
Course: Small Engine Technology II (20110-II) > Section: Applying Safety Practices on the Job

Identification should include describing the signage and operating procedures for

- eye-wash station
- lockout/tagout
- universal spill kit
- fire/first-aid blanket.

Process/Skill Questions:

- What safety equipment provides additional eye protection?
- How often should eye-wash stations be checked?
- When should a lockout/tagout be used?
- When should a spill kit be used?