Title: Service the alternator.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Service should follow manufacturers specifications and instructor’s guidelines and include a visual inspection to check for

- broken or loose components
- burned wiring
- melted components
- proper output.

Process/Skill Questions:

- Why would the alternator need cleaning/inspecting?
- What problems might be identified by a visual inspection?
- What problems could this inspection prevent?