Title: Troubleshoot the charging circuit, using a manufacturers guide.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Troubleshooting should include using a manufacturers guide to check for open and short circuits and malfunction of electrical components, according to manufacturers specifications and instructor's guidelines.

Process/Skill Questions:

- What process is used in troubleshooting?
- When would troubleshooting be necessary?
- Where would one find the starting point for determining the problem?