Title: Service alternator components.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Service should follow manufacturers specifications and instructor’s guidelines and include disassembling the alternator and testing

- diodes and bridge
- electrodes
- slip rings
- brushes
- starter windings
- rotor
- bearings
- capacitors.

Process/Skill Questions:

- When would one choose to replace rather than repair components of the alternator?
- What procedure would be used to determine if a component needs replacing?
- What safety procedures would be followed in repair of an alternator?