Title: Demonstrate the use of woodworking/carpentry equipment.
Course: Applied Agricultural Concepts (18002-I-18) > Section: Performing Woodworking/Carpentry Operations

Demonstration should include the use of PPE and the operation of equipment in accordance with manufacturer recommendations, passing all required safety tests.

Process/Skill Questions:

- What determines the type of equipment to be used for a given application?
- What adjustments to the equipment may be necessary for completion of a woodworking/carpentry task?
- What PPE should be worn while using woodworking/carpentry equipment?